/*
 Navicat Premium Data Transfer

 Source Server         : database
 Source Server Type    : MySQL
 Source Server Version : 50737
 Source Host           : 127.0.0.1:3306
 Source Schema         : database

 Target Server Type    : MySQL
 Target Server Version : 50737
 File Encoding         : 65001

 Date: 01/01/2022 00:00:00
*/

SET NAMES utf8mb4;
SET FOREIGN_KEY_CHECKS = 0;

-- ----------------------------
-- Table structure for __PREFIX__TABLE
-- ----------------------------

SET FOREIGN_KEY_CHECKS = 1;